/*
 Navicat MySQL Data Transfer

 Source Server         : 本地
 Source Server Type    : MySQL
 Source Server Version : 50740 (5.7.40-log)
 Source Host           : localhost:3306
 Source Schema         : hkcdb

 Target Server Type    : MySQL
 Target Server Version : 50740 (5.7.40-log)
 File Encoding         : 65001

 Date: 20/08/2025 14:00:53
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for hkc_changeshifts_drug
-- ----------------------------
DROP TABLE IF EXISTS `hkc_changeshifts_drug`;
CREATE TABLE `hkc_changeshifts_drug`  (
  `id` int(11) NOT NULL AUTO_INCREMENT COMMENT '主键',
  `changeShifts_id` int(11) NULL DEFAULT NULL COMMENT '交接班表主键',
  `drug_id` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `RealNumber` int(11) NULL DEFAULT NULL COMMENT '实物数',
  `orderNumber` int(11) NULL DEFAULT NULL COMMENT '处方数',
  PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 13 CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT = Dynamic;

SET FOREIGN_KEY_CHECKS = 1;
