/*
 Navicat MySQL Data Transfer

 Source Server         : 本地
 Source Server Type    : MySQL
 Source Server Version : 50740 (5.7.40-log)
 Source Host           : localhost:3306
 Source Schema         : hkcdb

 Target Server Type    : MySQL
 Target Server Version : 50740 (5.7.40-log)
 File Encoding         : 65001

 Date: 26/08/2025 09:01:46
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for settingmanu
-- ----------------------------
DROP TABLE IF EXISTS `settingmanu`;
CREATE TABLE `settingmanu`  (
  `ID` int(11) NOT NULL AUTO_INCREMENT,
  `Manu_Name` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '菜单名',
  `Manu_Icon` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '菜单图标',
  `Path` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '菜单页面地址',
  `Culture` varchar(10) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '中文zh-CN;英文en',
  `UseStatus` int(11) NULL DEFAULT NULL COMMENT '可用状态0不用；1在用',
  PRIMARY KEY (`ID`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 5 CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT = DYNAMIC;

-- ----------------------------
-- Records of settingmanu
-- ----------------------------
INSERT INTO `settingmanu` VALUES (1, '登录设置', 'lock', '/manage/setting/login', 'zh-CN', 1);
INSERT INTO `settingmanu` VALUES (2, '冰箱设置', 'build', '/manage/setting/Fridge', 'zh-CN', 0);
INSERT INTO `settingmanu` VALUES (3, 'Login Setting', 'lock', '/manage/setting/login', 'en', 0);
INSERT INTO `settingmanu` VALUES (4, 'Fridge Setting', 'build', '/manage/setting/Fridge', 'en', 0);

SET FOREIGN_KEY_CHECKS = 1;
